Scale 19: Gap

Cons 100 Verts

Cons 20 Mammals

RepeatMasker

10 kb panGoat 47,720,000 47,725,000 47,730,000 47,735,000 47,740,000 47,745,000 47,750,000 47,755,000 Gap Location

GC Percent in 5-Base Windows

NCBI Gene Predictions

pan Gene Predictions pan-sequences location

expreBar

Haploid Copy Number

LOC102172482 XM_013972124.2 LOC108638229 XM_018064051.1 GH1 NM_001285586.1

CD79B XM_005693998.3 CD79B XM_005693997.3 SCN4A XM_005694000.3

scaffold428_len16411826_cov227_129780...

scaffold428_len16411826_cov227_129...

LOC102172482

LOC108638229

GH1

CD79B

SCN4A

CNV39540

GC percent