Scale 12: Gap 20 kb GRCg6a 5,245,000 5,250,000 5,255,000 5,260,000 5,265,000 5,270,000 5,275,000 5,280,000 5,285,000 5,290,000 Gap Location

GC Percent in 100-Base Windows

NCBI Gene Predictions for chicken(GRCg6a)

429samplesExpreBar

PPARG XM_015292931.2 PPARG XM_025154399.1 PPARG XM_015292933.2 PPARG NM_001001460.1 PPARG XM_025154400.1

PPARG

GC percent