Scale 1: Gap 1 kb UOA_WB_1 500 1,000 1,500 2,000 2,500 Gap Location

GC Percent in 5-Base Windows

NCBI Gene Predictions for WaterBuffalo (UOA_WB_1) expreBar

GC percent