Scale 2: Gap 5 kb UOA_WB_1 35,740,000 35,745,000 Gap Location

GC Percent in 5-Base Windows

NCBI Gene Predictions for WaterBuffalo (UOA_WB_1)

expreBar

KLC4 XM_006069236.2 KLC4 XM_025269608.1 KLC4 XM_025269613.1 KLC4 XM_025269620.1 KLC4 XM_025269622.1 KLC4 XM_025269626.1 KLC4 XM_025269633.1 KLC4 XM_025269639.1 KLC4 XM_025269647.1 KLC4 XM_025269601.1 KLC4 XM_025269655.1

KLC4

GC percent